Polish Manufacturers of Equipment for the Agriculture and the Food Industry

CATALOGUE

Text: Garski Multimedia

Editor: Krzysztof Garski

Translation: Skrivanek

Publisher:

Polish Agency for Enterprise Development

ul. Pańska 81/83, 00-834 Warszawa, Poland

www.parp.gov.pl

© Polish Agency for Enterprise Development 2015

All product names, logos, and brands mentioned in this publication are property of their respective owners.
The publication and a database of companies are also available at www.expo.gov.pl

ISBN: 978-83-7633-211-6

Free copy

I edition

Pre-press, printing, binding:

Wydawnictwo Naukowe Instytutu Technologii Eksploatacji – PIB

www.itee.radom.pl

This publication has been financed from the state budget by the Polish Ministry of Economy.

The sector of agricultural machinery in Poland

Polish sector of agricultural machinery has been developing dynamically since 2000, when Poland started to receive aid for modernisation from the pre-accession funds (PHARE, SAPARD). Co-financing by the European Union a half of the costs of purchasing machinery gave a development impetus for the producers of this kind of machinery. The producers of agricultural machinery had also used the EU funds to modernise the production technology.

After the accession of Poland to the European Union in 2004, the pace of development of the sector accelerated even more, with sale to the EU markets playing an increasingly significant part. Today, around 50 plants manufacturing agricultural equipment are the core of this sector. These are usually middle-sized enterprises, but several are large companies, employing over 250 people. Moreover, some 200 small enterprises operate on the market, which produce agricultural equipment and which grow dynamically. Their ownership structure is based predominantly on private Polish capital.

Polish production plants today manufacture all kinds of machinery used in agriculture (except for most of self-propelled large machines). The agricultural machinery sector in Poland is characterised by its openness for innovation and cooperation in implementing modern production technologies.

As much as 81% of sprayers used in Polish agriculture have been produced in Poland. For ploughs, this figure is 74%. Also in the category of machinery for farms of 15–50 ha in area, Polish producers dominate. The production of tractors, both for domestic and international market, has a significant share in this sector. Thanks to the co-financing under the Programme for Agriculture and Rural Development, Polish farmers purchased 40 thousand new tractors. 2007 was record-breaking – with 7,405 machines produced, out of which as many as 4,141 were sold abroad.

The production of agricultural machinery has increased steadily since the accession of Poland to the EU. For example, in 2005 ca. 5,200 ploughs were produced in Poland, as well as 2,000 cultivators, and 8,600 sprayers. In 2010, the production increased to 7,000, 7,900 and 9,700 respectively, and in 2012 the corresponding figures were: 9,600 ploughs, 10,300 cultivators, and 11,200 sprayers.

The most important characteristics of the sector of agricultural machinery production in Poland include:

high quality, modern technologies and price competitiveness,

constant modernisation of design and production technology,

high level of demand in Polish farms for new tractors and other machinery, stimulated by the Union funds (SAPARD, PHARE, RDP, direct payments), and demand for Polish food on the world markets,

systematic increase in the sale of Polish agricultural machinery abroad, first of all on the EU market,

ability to compete with machinery producers from other countries.

Sources:

http://www.farmer.pl/finanse/podatki-rachunkowosc/kowalski-wyjatkowo-trudny-rok-dla-rolnikow-i-producentow-zywnosci,54765.html

http://www.rolne24.com.pl/news,polski-przemysl-maszyn-rolniczych--jego-potencjal-i-pozycja-na-rynku-,141.html

http://www.tvr24.pl/wiadomosc-Polski_przemysl_maszyn_rolniczych_jego_potencjal_i_pozycja_na_rynku-3096.html

http://www.tvr24.pl/wiadomosc-Branza_maszyn_rolniczych-5022.html

Agricultural machines and equipment

Agribot Sp. z o.o.

AGRIBOT is an autonomous, caterpillar-tracked vehicle designed to work in orchards, vineyards and farms. The robot is a self-propelled device on a crawler chassis with a diesel engine (power 75 hp). AGRIBOT is equipped with a precise location system (GPS signal with an accuracy of 2 cm). During its work information about position and work status are transferred to a dedicated server. An application allows controlling current position in an orchard, work status and a view from AGRIBOT’s camera.

Products

Autonomous orchard vehicle Agribot.

ul. Duńska 13
54-427 Wrocław
Tel. +48 605 889 177
www.agrirobo.eu
office@esdc.pl

Other

Agrireg Sp. z o.o.

The company offers an innovative system ‘Agridata’ for the management of the farm. At any time and in any place it helps monitor agricultural work at a farm and gives an insight into historical data about agricultural work. The software automatically fills in the required documentation (cards, records) and prepares financial calculations of the profitability of production. The system helps improve the growth of competitiveness, saves time and facilitates access to safe food markets. Better decisions are made thanks to the system.

Products

‘Agridata’ system.

ul. Duńska 13
54-427 Wrocław
Tel. +48 501 206 822
www.agridata.eu
e-mail: d.swiatowy@agridata.eu

Machines and equipment for the food industry, sorting and packaging machines

Atm Group Sp. z o.o. Sp.k.

ATM Group is a group of companies designing and producing machines for the food industry. Its engineers, working in a well-coordinated team and having an extensive experience in the food industry, design food processing plants, technological lines and an equipment tailored to client’s needs. Each project is individually coordinated. In a close cooperation with specialists from the food business the company has introduced a lot of innovative products. Atm Group provides clients with technological and technical support. Projects were implemented in such countries as: Azerbaijan, Uzbekistan, Georgia, Armenia, Russia, Ukraine, Belarus, Lithuania, Latvia, Estonia, Slovakia, Czech Republic, Poland, Hungary, Bulgaria, Romania.

Products

Filling lines for: juices, water, carbonated drinks; dairy in PET bottles; dairy in PS/PP cups; for mayonnaise and sauces. Production lines for: ice cream – lolly-ice, ice-cream in cups, ice-cones; canned fish and meat; ready meals. Filling & packing lines, conveying systems.

ul. Jankowicka 19
44-321 Marklowice
Tel. +48 32 4231340,
Fax: +48 32 4231340
www.atmg.eu
contact@atmg.eu

Machines and equipment for the food industry, Machines and equipment for catering, Other

ATT Sp. z o.o.

The company offers stainless steel elements. It has a highly qualified staff and advanced machinery. ATT is one of the leading producers of stainless steel drainage systems. The company works for the food, chemical, pharmaceutical and construction industries. It has a team of engineers who combines extensive knowledge, experience and passion for their work. Their comprehensive knowledge helps create best solutions suiting client’s needs.

Products

Point and linear drainage – floor drains, channels, cleaning pipes, top slot gratings; manhole covers, media boxes; food processing equipment – transport carts, hygiene.

ul. Albatrosów 16c
30-716 Kraków
Tel. +48 12 2902930
Fax: +48 12 2902931
www.att.eu
att@att.eu

Sorting and packaging machines

BAG in BOX Wojciech Płocki

Production of aseptic packaging machines “BAG in BOX” for packaging processed fruits and vegetables – wine, juice, concentrates, purees.

Products

Aseptic packaging machine “BAG in BOX” – ASEPTA 5000, packaging machine ULTRA CLEAN 1.220, mobile packaging machine for water WODOERKA 1.20.

ul. Kleeberga 8-145
20-243 Lublin
Tel. +48 604 542518
Fax: +48 81 7561267
www.maszynypakujacelublin.pl
info@baginboxwp.pl

Agricultural machines and equipment, Other

Bartesko Bartłomiej Skowroński

Manufacturing cabins and tempered glass for tractors and forklifts. Manufacturing electric transport vehicles.

Products

Electric cars and vehicles, cabins for tractors and forklifts.

ul. Floriańska 35
63-720 Koźmin Wlkp.
Tel. +48 62 7216656
Fax: +48 62 7216656
www.pojazdyelektryczne.eu
pojazdyelektryczne@barteslp.pl

Machines and equipment for the food industry; Machines and equipment for catering; Refrigerating and freezing equipment; Other

Borato Investment Sp. z o.o.

The manufacturer of high-quality machines and equipment for the food industry. It offers equipment for the meat industry, poultry, fish and dairy processing industry. The company offers also chambers and boilers. Products made of acid-proof steel for wholesalers and retailers. Tailor-made products. Metalwork and welding services.

Products

Smoke-steaming chambers, traditional smoke chamber, meat boiler, smoke generator, vacuum tumbler, stuffing mixer, food grinders, ice generator, hood, stainless steel furniture, sinks.

ul. Nakielska 35
42-600 Tarnowskie Góry
Tel. +48 32 7682700
Fax: +48 32 7682719
www.borato.pl
borato@borato.pl

Machines and equipment for the food industry, Sorting and packaging machines

B&P Engineering Sp. z o.o. Sp. k.

B&P Engineering, one of the leading companies, has been providing client-specific solutions for the food, pharmaceutical, and cosmetic industries for over 10 years. The wide range of services includes design and construction of machines, process engineering, control and measurement techniques, automation of technical processes and mechanical treatment of steel. The clients, well-known companies from both food and non-food industries, have been impressed by the company’s competence and reliability. B&P offers high quality equipment and comprehensive automation concepts for manufacturing processes.

Products

Equipment and machines for the production of concentrates, equipment and machines for bottling plants, tanks, automatic systems and controls, mixers etc.

ul. Lubomirskich 1e
37-200 Przeworsk
Tel. +48 16 6490098
Fax: +48 16 649 00 99
www.engineering-bp.com
sekretariat@engineering-bp.com

Other

CHEM-TOP Sp. z o.o.

The company is specialized in providing equipment, installations and technologies for industrial wastewater treatment. It offers high-efficienct container sewage treatment plant for the purification of industrial wastewaters by dissolved air flotation (DAF). The advantages: above average efficiency up to 10 m³/h; it requires only about 30 minut of human labor per day; small area; high scalability; low consumption of electricity and water; can be installed anywhere outside the plant; it can be installed in most of food industry companies.

Products

High-efficiency container wastewater treatment plant.

ul. Brzozowa 19a
87-100 Toruń
Tel. +48 512 044972
www.chem-top.pl
cezary.topolski@chem-top.pl

Machines and equipment for the food industry

COBE s.c.

The company was established in 1994. It develops and manufactures conveyor systems and components for the food industry. The company offers curved conveyors, roller conveyors, screw conveyor, inspection conveyor, feeders.

Products

Curved conveyors, roller conveyors, screw conveyors, inspection conveyors, feeders.

ul. 3 Maja 56
81-858 Sopot
Tel. +48 58 5502081
www.cobe.com.pl
biuro@cobe.com.pl

Machines and equipment for the food industry, Sorting and packaging machines

Dimark Sp. z o.o.

The company is specialized in designing, assembling, and servicing conveyors for every industry. It was established in 1992 and currently it offers advanced, modern solutions that are able to compete with the equipment produced by the largest manufacturers of conveyors.

Products

Conveyor belts, packaging conveyors, roller conveyors, palletizers, wrappers.

ul. Zachodnia 3
62-002 Złotkowo
Tel. +48 61 8956002
www.dimark.com.pl
office@dimark.com.pl

Machines and equipment for the food industry

Enitra Sp. z o.o.

The company was established in Walbrzych in 1996. Since the beginning it has been constantly growing. Each year the company has expanded product portfolio. Recently, it has quadrupled production area, storing capabilities and office space. The number of clients has exceeded 5000. A team of 80 highly qualified employees – many of them with a long professional experience – cares about clients.

Products

Conveyors belts, conveyor rollers, drive belts, components for conveyors.

ul. 1 Maja 62
58-300 Wałbrzych
Tel. +48 74 8439124
www.enitra.pl
enitra@enitra.pl

Machines and equipment for the food industry

Fabryka Maszyn Spożywczych "Spomasz" Pleszew S.A.

The company with over 120 years of tradition manufactures machines and equipment for the food industry. Machines made by the company work in almost every food processing company in Poland. Spomasz has exported machines and equipment to many countries of the world since 1954.

Products

Production of machines for food processing industry, in particular – confectionery, fruits and vegetables processing, spirits and other sectors, like the meat industry, fat industry, pharmaceutical, chemical sectors.

ul. Słowackiego 14
63-300 Pleszew
Tel. +48 62 7422313
www.spomasz-pleszew.pl
spomasz@spomasz-pleszew.pl

Agricultural machines and equipment, Machines and equipment for the food industry

Faspol Sp. z o.o.

Tanks and industrial silos, pressure vessels, technological lines, mixers and other solutions produced by the company, are being sold all around Europe. The equipment fulfills all the requirements of the industry and has appropriate certificates and documentation. Steel products aren’t the only part of the company’s portfolio – it offers also consulting, design services, and other additional services for the truly comprehensive offer. The company is able to manufacture according to design delivered by the client and welcomes new ideas and solutions.

Products

Tanks and storage silos, pressure vessels, mixers, technological lines, systems of control and automatics.

ul. Rokicińska 156
92-412 Łódź
Tel. +48 42 6725465
Fax: + 48 42 6725465
www.faspol.pl
biuro@faspol.pl

Agricultural machines and equipment

Felmix

The company develops innovative solutions for design and production of modern components for irrigation and fertigation systems. It also manufactures agricultural machinery. Felmix ensures the highest quality and fulfilling clients’ needs.

Products

Reel irrigation machines, equipment for strawberry farming, drip irrigation systems, spray booms, hillformers, water filtration systems, high efficiency unit pumps, construction of PE and PVC water pipes, drainage pumps, centrifugal pumps, spray system, high quality filtration stations.

Zdziarka 3
09-150 Czerwińsk nad Wisłą
Tel. +48 602 685574
Fax: +48 24 2315558
www.felmix.com.pl
felmix@wp.pl

Agricultural machines and equipment, Machines and equipment for the food industry

Feerum S.A.

The company is one of the biggest manufacturers of grain elevators for drying and storage of plant products (cereals, legumes and oilseeds, corn, and others). Comprehensive solutions are available, including analysis of client’s needs, technology proposals, production of equipment, launching of an elevator, after-sales services, maintenance and supply of components.

Products

Cyclofans, bucket elevators, belt conveyors, silos, dryers.

ul. Okrzei 6
59-225 Chojnów
Tel. +48 76 8196738
Fax: +48 76 8196738
www.feerum.pl
biurozarzadu@feerum.pl

Machines and equipment for the food industry

FP SPOMAX S.A.

The company is a manufacturer of machines, equipment and production systems for the milling, fodder industry, spices, coffee and tea production. The prototypes of machines are tested for many hours in the most extreme conditions, before introducing into mass production. Efficiency and durability are of great concern. The company runs a test station and a laboratory, where products are thoroughly checked before the delivery.

Products

Machines for mills and fodder producers, rolls, Roots-type blowers, other equipment.

ul. Kaliska 61/63
63-400 Ostrów Wielkopolski
Tel. +48 62 5921717
Fax: +48 62 7361136
www.spomax.pl
zdzislaw.paczkowski@spomax.pl

Machines and equipment for the food industry

GMN Techmet Sp. z o.o.

The company was founded in 1999. It employs 49 people and owns an area of 2,5 ha, including 1,673 m² production floor and 872 m² of office space. GMN Techmet operates modern production machinery that allows to run production in accordance with the client’s needs. Highly qualified contractors support the production process.

Products

Pig slaughterlines, cattle slaughterlines, deboning lines, conveyor systems

ul. Wróblewskiego 2
09-200 Sierpc
Tel. +48 24 2750505
Fax: +48 24 2750505
www.techmet.com.pl
techmet@techmet.com.pl

Machines and equipment for the food industry

GoBEST

The company was established in 1992. It designs and manufactures production lines, modifies production lines to changing needs and offers contract production. GoBEST offers comprehensive solutions for the food industry, like production lines for rolled and extruded pasta, dryers, production lines for granulated tea and other equipment.

Products

Design and production lines for the food industry.

ul. Rozwadowska 9
61-334 Poznań
Tel. +48 61 8710095
Fax: +48 61 871 00 96
www.gobest.com.pl
info@gobest.com.pl

Other

Hydropath Sp. z o.o.

The company offers consulting and delivery of equipment for water treatment without the use of chemicals. A wide range of solutions for the livestock industry and production industry is available. Offered equipment protects water and water installation against sediments. No other technologies and chemicals are required. The company’s technology is energy efficient, eco-friendly and easy to use.

Products

HydroFLOW INDUSTRIAL – equipment for water treatment, protection against sediment and disinfection.

ul. Wierzbowa 111
43-100 Tychy
Tel. +48 500 068 835,
Tel. +48 32 4450683
Fax: +48 32 4450684
www.hydropath.pl
biuro@hydropath.pl

Refrigerating and freezing equipment

IGLOO

The company is one of the most dynamically growing producers of cooling solutions. It delivers for small and big retails chains, gas stations, stores, restaurants, bars and other businesses where cooling or heating solutions are needed. The company’s products are durable, reliable, energy efficient and functional, their design – modern and ergonomic. Since 1986, IGLOO’s products have gained recognition in Poland and abroad.

Products

Refrigerated counters, cooling merchandisers and cabinets, freezing cabinets and counters, freezing islands, pastry display counters, ice cream dispensers, salad display units, ambient devices, other equipment.

ul. Kazimierza Wielkiego 13
32-700 Bochnia
Tel. +48 14 6621910
Fax: +48 14 6621912
www.igloo.pl
info@igloo.pl

Machines and equipment for the food industry, Other

Instytut Napędów i Maszyn Elektrycznych KOMEL

Institute of Electrical Drives and Machines KOMEL was established over 65 years ago. It has been producing cutters for the meat industry for nearly 30 years. It researches on the development of modern machines and electrical equipment. KOMEL has a modern research laboratory and has an experienced team of researchers and designers. The company manufactures special electric machines, mainly cutters for the meat industry and other equipment like power supplies and counterweights.

Products

Cutters – circular saws for partitioning, cutters – circular saws for slaughter, cutters – band saws for slaughter, cutters – frame saws for slaughter, counterweights, power supplies.

ul. Moniuszki 29
41-209 Sosnowiec
Tel. +48 32 2999381,
+48 32 2582041
Fax: +48 32 2599948
www.komel.katowice.pl
zaklad@komel.katowice.pl

Machines and equipment for the food industry

INTERMIK Sp. z o.o.

The company is one of the key suppliers of production lines and solutions for the meat industry. It offers realization of comprehensive projects in the field of meat processing. INTERMIK Sp. z o.o. is a member of INTERMIK holding, owner and co-owner of several European companies. The company offers technical services, technology solutions and consulting. It delivers spare parts, supplies, maintenance, warranty and post-warranty services.

Products

Machines and equipment for slaughter, deboning, meat processing; thermal chambers, climatic chambers, other.

ul. Elbląska 15/17
01-747 Warszawa
Tel. + 48 22 6334285
Fax: + 48 22 6334296
www.intermik.eu
intermik@intermik.eu

Machines and equipment for catering

Kromet Sp. z o.o.

The company has operated in Polish market for 50 years. It is one of the leading manufacturers of catering equipment for thermal food processing. It offers kitchen equipment for restaurants, bars, canteens etc. All products fulfill requirements of the food industry and are certified. Kromet has received many awards and distinctions at national and international events.

Products

Kitchen stoves, ovens, frying pans, cauldrons, tableware buffets, grill plates.

ul. Pocztowa 30
66-600 Krosno Odrzańskie
Tel. +48 68 3835324
www.kromet.com.pl
handlowy@kromet.com.pl

Machines and equipment for the food industry, Agricultural machines and equipment

Łuczak Maszyny Rolnicze Stanisław Łuczak

For 30 years the company has developed and produced modern machines for agriculture. It won numerous industry awards during fairs and competitions. The company’s products are thoroughly tested and new solutions are implemented on a regular basis. The company exports to, among others, France, Germany, Hungary, Moldova, Russia, Sweden, Estonia, Latvia, Lithuania, Ukraine and the Czech Republic.

Products

Machines for planting and cultivating, such as EKO-PIELNIK – weeding machine for eco-cultivation, vegetable planters, hillformers, machines for picking vegetables, conveying belts, washers.

Bartochów 9
98-290 Warta
Tel. +48 43 8294396,
+48 607 448395
Fax: +48 43 8294396
www.luczakmaszyny.com
biuro@luczakmaszyny.com,
luczakmaszyny@gmail.com

Machines and equipment for catering, Machines and equipment for the food industry

Ma-Ga Sp. z o.o.

The company was established in 1956. It offers electrical gravity slicers, semi-automatic slicers and automatic slicers. Another important area of the company’s activity is production of medium- and high-efficiency vegetables cutters. The company implements constant redesigning and improvement of products. The strategic goal of the company is expanding into the new areas of the food industry.

Products

Slicers, cutters, meat mincers, steakers, bone saws.

ul. Kujawska 136
skr. poczt. 142,
85-950 Bydgoszcz
Tel. +48 52 3704500
www.maga.com.pl
maga@maga.com.pl

Machines and equipment for the food industry

Metalbud Sp. z o.o.

The company is a modern enterprise and a recognized manufacturer of high quality machines and equipment for meat processing. The company’s tradition of reliable production and professional service goes back to 1974. Metalbud manufactures approximately 20 series comprising almost 150 models of machines for meat and food processing, as well as technological lines for individual applications. Its trading network (direct and distributors) reaches over 71 countries on all continents.

Products

Machines and equipment for meat, fish and cereals processing: smokehouses, cleaning machines, tumblers, mixers, vacuum tumblers, other.

Podlas 3 (przedłużenie ul. Tomaszowskiej)
96-200 Rawa Mazowiecka
Tel. +48 46 8145500
www.metalbud.com
metalbud@metalbud.com

Machines and equipment for the food industry, Sorting and packaging machines, Refrigerating and freezing equipment

Mega Sp. z o.o.

The company manufactures equipment for fruit and vegetable processing. It delivers complete processing lines and devices designed in accordance with client requests. Among others, Mega offers complete lines for freezing fruits and vegetables, lines for the preparation of fresh vegetables, and packaging lines for pickles. The company cooperates with processesing plants and food producers. There are 10 representative offices in 10 countries on 4 continents: Europe, Asia, Africa, South America.

Products

Washers for fruits and vegetables, calibrators, peelers, packaging machines for pickles, dosage units, broccoli and cauliflower processing lines, conveyors.

ul. Przemysłowa 52
24-200 Bełżyce
Tel. +48 81 5162003
Fax: +48 81 5172263
www.megabelzyce.pl
biuro@megabelzyce.pl

Agricultural machines and equipment

Metal-Fach Sp. z o.o.

The company’s headquarters is based in Sokolka, in northeastern Poland. It is one of the leading manufacturers of agricultural machines in Poland and in the world. In 2014, the company celebrated its 25th anniversary. The plant’s area is 16,5 ha, including 4,3 ha under the roof. In 2010 trailers were added to the company’s portfolio.

Products

Bale grabbers, front loaders and components, bale wrappers, trailers, spreaders, feeder wagons, loading boxes, cultivators, steel constructions.

ul. Kresowa 62
16-100 Sokółka
Tel. +48 85 7119840
Fax: +48 85 7119065
www.metalfach.com.pl
biuro@metalfach.com.pl

Other

MIKSTER Sp. z o.o.

The company is an independent, stable, fast-growing enterprise, operating for over 20 years in Poland and abroad. It is the largest Polish producer of microprocessor controllers for the meat industry. The technology of production has been constantly developing and new products have been entering markets. The company offers digital recorders, humidity sensors, PLCs. Comprehensive design services, assembling and implementation services in the field of electronics, automation, visualization and control systems are offered.

Products

Automatic components for the food industry.

ul. Wojkowicka 21
41-250 Czeladź
Tel. +48 32 7637777
Fax: +48 32 7637594
www.mikster.pl
info@mikster.pl

Machines and equipment for the food industry, Sorting and packaging machines

Mysak Group Sp. z o.o. Sp.k.

The company combines experience in the implementation of prototype machines and equipment and custom-designed technologies. The company continually develops production technology and the quality of products. During 15 years of activity, many original machines, equipment and installations for the food, chemical and other industries were carried out.

Products

Production lines, packaging machines, dosing machines, cooling machines, mixers, other.

ul. Strzeszyńska 125
60-479 Poznań
Tel. +48 61 8429634
Fax: +48 61 8429634
www.mysak.pl
mysak@mysak.pl

Refrigerating and freezing equipment

NordSystem s.c.

The company has specialized in delivering solutions for cooling and air-conditioning since 1996. It offers design and assembly services. It also sells machines.

Products

Solutions for cooling, storage and freezing products (fruits, vegetables, meat, fish and dairy).

ul. M. Reja 62
20-458 Lublin
Tel. +48 81 7442617
Fax: +48 81 7442617
www.nordsystem.pl
info@nordsystem.pl

Machines and equipment for the food industry

PEK-MONT Sp. z o.o.

The company is one of the leading companies in the manufacturing operations. Since the early 90’s, the company has specialized in the manufacture of machinery and equipment for the food industry and wastewater treatment plants, offering a wide range of various machines. Its products are sold throughout the world, in Europe – both East and West and in the furthest corners of Asia, Australia, Africa and the Americas.

Products

Thermal treatment equipment, slaughter lines, partitioning lines, warehouse lines.

ul. Spółdzielcza 30
09-230 Bielsk
Tel. +48 24 2615509
Fax: +48 24 2615509
www.pekmont.pl
pekmont@pekmont.pl

Agricultural machines and equipment

POLANES Serwis-Centrum Ltd.

The company combines hard work and a creative vision. That’s why it is one of the leading manufacturers of modern milking machines. The company was founded 20 years ago and since then it has been producing milking systems worldwide under POLANES trade mark: milking parlors of various type (Herringbone, Side-by-Side, Swing-Over, Tandem), pipeline milking machines, milk control systems, feeding stations, accessories and other spare parts. The company has provided over 2500 milking machines to dairy farms of cows, goats, sheep and buffaloes.

Products

Milking unit KOMPAS 100, 200, 500; herd management system INFODEX; feeding station PASZOTEC; washing unit AQUARIUS, AQUATRONIC; vacuum pump units 500, 600, 1000, 1200, 2000, 3000 l/min.

ul. Toruńska 137
85-831 Bydgoszcz
Tel. +48 52 3629197
Fax: +48 52 3629447
www.polanes.com.pl
sales@polanes.com.pl

Agricultural machines and equipment, Other

POMOT Sp. z o.o.

The company was established in 1951. Currently it employs 130 people and offers machines for agriculture and municipal services. The company has ISO 9001:2008 certificate. The company provides its clients with own logistics of ordered products. Thanks to its brand and experience, POMOT sells 800 vacuum trucks annually. In 2010 a license for fertilizer and lime spreaders production was bought from TRANSPREAD, New Zealand. The company is also the largest producer of metal containers and it offers machines like sewer cleaning devices and waste containers, for example KS-8 type.

Products

Vacuum trucks (capacity 2500–30000L with accessories), fertilizer and lime spreaders (capacity 2–24 tons), sewage cleaning devices, metal containers for different purposes, special agricultural devices, slurry disposal.

ul. Słowiańska 2
74-500 Chojna
Tel. +48 91 4141355
Fax: +48 91 4141302
www.pomot.pl
pomot@pomot.pl

Machines and equipment for the food industry, Sorting and packaging machines, Other

Precision Machine Parts Poland Sp. z o.o.

The company was founded in 1997. It is a qualified manufacturer and supplier of parts, components for the food, machine, printing, medical, aircraft and packaging industries. Prototypes and small batches of products are offered. PMP Poland manufactures in accordance with ISO 9001:2008, ISO 14001:2004, PN-N 18001:2004 and OHSAS 18001:2007. 75% of the output is exported to the Netherlands, Germany, Switzerland, the United Kingdom, Austria, France and the USA. Sales volume in 2013 amounted to 17 Mio EUR.

Products

Single sheet metal and machined parts, enclosures for packaging machines, cooling and heating (drying) tunnels, manual and automatic loading system, conveying systems.

ul. Warsztatowa 19A
26-600 Radom
Tel. + 48 48 3686600
www.pmp-poland.pl
info.pmp@itmgroup.eu

Agricultural machines and equipment

PROMA Wojciech Płudowski

Production of machines (wipers) for selective application of herbicides.

Products

Hand weed-wipers for applying herbicides on clumps of resistant weeds, in interrows etc.

Wide weed-wipers for wider herbicide patches and for wider areas.

ul. Krzyska 65
33-103 Tarnów
Tel. +48 14 6251133
Fax: +48 14 6562594
www.mazacze.com.pl
mazacze@gmail.com

Agricultural machines and equipment

Pronar Sp. z o.o.

The company is one of the leading manufacturers of agricultural machinery in Poland and abroad. PRONAR has dynamically developed from a small enterprise to one of the largest companies in Poland. It employs 1600 people and is listed among 500 largest companies according to the weekly ‘Polityka’. Factories are located in the Podlaskie voivodeship, among others in Narew, Strabla, Narewka and Siemiatycze. New specialized factories are planned. Numerous trading parters around the world are a proof of the company’s international activity.

Products

Trailers, green fodder machinery, municipal machinery, tractors.

ul. Mickiewicza 101A
17-210 Narew
Tel. +48 85 6816329,
+48 510 925666
Fax: +48 85 681 63 83
www.pronar.pl
jan.kuklinski@pronar.pl

Machines and equipment for the food industry, Sorting and packaging machines

REMID Strojek M. Jarząb J. Spółka jawna

Manufacturer of machinery and equipment for the food industry.

Products

Palletizers, package washers, fillers, carousel closing machines, labeling machines, packaging lines (thermofoil), conveyors.

ul. Rząsawska 22
42-209 Częstochowa
Tel. +48/34/366-86-00
Fax: +48/34/366-86-01
www.remid.pl
info@remid.pl
sekretariat@remid.pl

Machines and equipment for catering, Other

Retech Sp. z o.o.

The company is located in the SEZ EURO-PARK Mielec. Since 2005 it has owned a production floor (2300 m²) and it employs 154 people. The output is mainly exported to the EU countries and the USA. High-quality products are manufactured thanks to the implementation of modern technologies and machinery, as well as the highly committed and qualified staff. The implementation of innovations is an important activity for the company.

Products

CNC, welding stainless steel, stainless steel furniture, trolleys, bases for appliances.

ul. Wojska Polskiego 6a
39-300 Mielec
Tel. +48 17 7881120
Fax: +48 17 7886411
www.retech.pl
retech@retech.eu

Machines and equipment for the food industry

Ruland Engineering&Consulting Sp. z o.o.

The company is specialized in designing, manufacturing and servicing of the equipment for the food, beverage and pharmaceutical industries. Planning, designing and manufacturing are parts of a coherent process, which takes place in a strict cooperation with the client. Putting the equipment into use does not mean its end – maintenance services are also offered. Strong emphasis on partnership is beneficial to both cooperating parties.

Products

Solid-dissolving plants, pasteurizers with plate and tube heat exchangers, dosing and mixing solutions, drinks carbonization equipment, deaeration units, blending systems, CIP equipment, production lines for carbonated and non-carbonated drinks, production lines for apple juice concentrate, production lines for other food products.

ul. Podleska 51
43-100 Tychy
Tel. +48 32 7897071
Fax: +48 32 7897042
www.rulandec.pl
info_pl@rulandec.com

Agricultural machines and equipment, Sorting and packaging machines

SORTER Sp.j. Konrad Grzeszczyk Michał Ziomek

Comprehensive services for orchard owners and farmers. The company is the only Polish manufacturer of comprehensive solutions for sorting lines in the fruit and vegetable processing industry. The company offers solutions for unloading, sorting, packaging and palletizing. Thanks to the use of the new technologies, the company is one of the leaders, introducing new trends of running orchards in Poland and abroad.

Products

Machines for sorting fruits and vegetables, packaging machines, palletizers, orchard harvesters and platforms, orchard carts, complex lines for sorting, packing and palletizing, maintenance-free storage systems, maintenance products like degreasers, cleaners, lubricants.

ul. Gdyńska 32
26-600 Radom
Tel. +48 48 3779999
Fax: +48 48 3779998
www.sorter.eu
marketing@sorter.pl

Machines and equipment for the food industry

Spomasz Zamość S.A.

The company has two production floors (30,000 m²) and employs 150 people, including 7 engineers and designers. Satisfied clients and high quality products are the company’s goal. Professional services are provided to all clients; cooperating suppliers are thoroughly selected.

Products

Components for production lines for the food industry, pumps, conveyors, chain conveyors, tanks.

ul. Szczebrzeska 19
22-400 Zamość
Tel. +48 84 6393671
Fax: +48 84 6396048
www.spomasz.biz.pl
spomasz@spomasz.biz.pl

Machines and equipment for the food industry, Other

TEWES-BIS Sp. z o. o.

The company was established in 1991. It is specialized in manufacturing machines, equipment and production lines for the food industry (mainly – dairy industry). TEWES-BIS offers design and production of machines, devices and production lines, analysis and implementation of production technology for the dairy industry. Among others, the company is specialized in production technologies of various types of cottage cheese and ripening cheese, technology and technique of washing systems, thermal processing of milk and cream, as well as production of fermented milk drinks.

Products

Production lines for dairy products; automatic production lines for cottage cheese, cheese and fermented milk drinks, CIP and COP washing systems, visualization and recording of production process, membrane filtration technologies.

ul. Zatorze 24
11-010 Barczewo
Tel. +48 89 5375100
Fax: +48 89 5149819
www.tewesbis.com.pl
firma@tewesbis.com.pl

Sorting and packaging machines

TREPKO Sp. z o.o.

The company is a global manufacturer of packaging equipment for the food industry. It boasts more than 65 years of experience and a position among market leaders. Trepko is trusted by clients from more than 120 countries. All offered products meet strict hygiene and quality requirements. Many years of experience and flexibility helps create tailor-made solutions even for the most demanding clients.

Products

Packaging machines for the food industry: dosing solutions, production lines, rotary filling machines, carousel machines, ready-made meals lines (sandwich packaging machine).

ul. Roosevelta 116
62-200 Gniezno
Tel. +48 61 4265041
Fax: +48 61 4265068
www.trepko.pl
trepko@trepko.pl

Machines and equipment for the food industry, Agricultural machines and equipment

Tubes International Sp. z o.o.

The company, established in 1993, provides professional solutions in the field of industrial hoses and couplings, as well as hydraulic hoses assemblies for the agriculture industry. The company has 21 branches in Poland and 11 abroad. Each of them has a sales department, a warehouse and a floor, where assembly and maintenance services are offered. A wide range of products for agriculture machinery, irrigation, cleaning, dedusting, transportation of food products and granulate is offered.

Products

Hoses (air and water, petrochemical, ducting and ventilation), hoses and accessories for cleaning, couplings (Storz, Camlock, lever, claw), clamps and ferrules, water and air quick release couplings, general purpose hoses and couplings, devices for hoses assembly, pipes, fittings for DIN 2353 pipes, clamps DIN 3015, valves and quick release couplings, seals, pressure gauges, stainless steel hose reels.

ul. Bystra 15A
61-366 Poznań
Tel. +48 61 6530222
Fax: +48 61 6530220
www.tubes-international.com
tubes@tubes-international.com

Machines and equipment for the food industry, Sorting and packaging machines

UNI-MASZ H.M. Juszczuk Sp.j.

The company manufactures equipment for transportation, pre-processing of fruits and vegetables, production lines, machines for sorting, weighing, cleaning, grinding etc. It operates in accordance with HACCP, the EU regulations and ISO 9001:2008 certificate. Manufactured devices are made of stainless steel and other materials approved for food contact. Tailor-made devices are offered. Modern machinery and qualified staff are the company’s assets.

Products

Conveyors, washers, air-water washers, peelers, polishers, drum calibrators, blanchers, sorters, dispensers, glazing machines, vacuum chambers, shredders, cutters, hydraulic hoppers, weighers, sewage filters, lyophilizers, gritting devices, stainless steel devices.

ul. Chmielowa 6
21-002 Jastków, Panieńszczyzna
Tel. +48 81 4714959;
+48 81 4714919
www.unimasz.eu
sales@unimasz.eu
biuro@unimasz.eu

Agricultural machines and equipment

Ursus S.A.

Manufacturer of agricultural machines and tractors.

Products

Tractors, agricultural machines: trailers, presses, spreaders, front loaders.

ul. Frezerów 7
20-209 Lublin
Tel. +48 22 2660266
Fax: +48 22 5065535
www.ursus.com
ursus@ursus.com

Machines and equipment for the food industry, Agricultural machines and equipment

WAMASZ

The company offers design services and production of machines and equipment for the machine and construction industries, mines, quarries, food industry, agriculture and orchards.

Products

Belt, roller and screw conveyors, lifters (hydraulic, electric, pneumatic), turntables, carousel systems, carts integrated with other means of transportation, automated systems, prototypes and tailor-made devices.

ul. Minakowskiego 12/66
10-768 Olsztyn
Tel. +48 501 216488
www.wamasz.pl
contact@wamasz.pl

Other

WickerPL Radomska Joanna

Production of containers and displays for storage and display of food in stores, canteens, hotels etc.

Products

Baskets for fruits and vegetables, baskets for bread, rolls, baguettes, displays for vegetables, fruits, bread, sweets and other, display baskets.

Łętownia 454
37-312 Łętownia
Tel. +48 17 2503838,
+48 503 139826
Fax: +48 17 2503858
www.wickerpl.com
wicker24.eu
biuro@wickerpl.com

Machines and equipment for the food industry, Sorting and packaging machines, Other

Wikpol Sp. z o.o.

Wikpol is an engineering company providing manufacturing-process automation services. The company owns design labs with high-tech equipment and software, manufacturing and assembly room and R&D lab. The lab is equipped with 3 robots FANUC Robotics: 4-axle M410iB, 6-axle R2000iB, 6-axle M10iA with advanced 2D system. Equipment made by the company is thoroughly tested and checked what minimizes risks concerning trial runs at client’s site.

Products

Product robotic packaging and palletizing lines, packing machines (big-bags, opened sacks, ventilated sacks), dynamic checkweighers, totalizers, electronic weighing and filling systems, IT systems for managing electronic truck weighing in the field, automatic lines for raw material assessment, accounting system, IT systems for managing palletizing lines and warehouse operations.

Konopnica 208B
21-030 Motycz k. Lublina
Tel. +48 81 5032330
Fax: +48 81 5032330
www.wikpol.com.pl
wikpol@wikpol.com.pl

The Polish Agency for Enterprise Development (PARP) is a government agency that has been supporting the development of entrepreneurship in Poland for 15 years. The objective of PARP is to support the development of small and medium-sized enterprises, i.e. establishment of new companies, improvement of qualifications and increase in capacity, strengthening of the competitive position based on innovation and modern technologies, creating a friendly business environment and providing conditions for conducting economic activity. PARP carries out activities supporting entrepreneurs (as well as: business environment institutions, local government units, state budget units, universities) using state budget funds and European funds. Both before and after the accession of Poland to the European Union, PARP has provided entrepreneurs with financial support, training and advisory support, as well as information support. In 2015 the Agency is responsible for the implementation of measures under three operational programmes: Innovative Economy, Human Capital and Development of Eastern Poland, as well as the programmes under the new financial perspective 2014-2020: Smart Growth, Eastern Poland and Knowledge, Education and Development.

PARP’s experience goes beyond the provision of EU aid to entrepreneurs. Several years ago the Enterprise Research Centre was established at the Agency to conduct research on entrepreneurship, innovation, human resources and services supporting the economic activity. The research results provide the basis for assumptions for other support programmes responding to identified needs of entrepreneurs. Since 2013, PARP has been implementing a pilot project to analyse the impact of planned and existing regulations on the sector of small and medium-sized enterprises (SMEs).

For the support to be efficient, entrepreneurs must have an easy access to information about the assistance. PARP has initiated the establishment of the National SME Services Network (KSU). The KSU offers advisory services to companies at each stage of business activity, starting from registration, through efficient operation and management of the company, to suspension or termination of activity. All KSU centres (approximately 200) function based on developed Services Standards thus ensuring that entrepreneurs receive the highest quality services.

Foreign government institutions and non-government organisations constitute an important group of partners of the Agency in a number of international projects for development of bilateral economic relations that have been implemented for many years.

The Enterprise Europe Network centre operating at PARP offers entrepreneurs an opportunity to benefit from the European market. The centre offers free-of-charge, comprehensive services including information, training and consulting, mainly on the European Union legislation and policies, conducting business activity in Poland and internationally, access to financing, internationalisation of enterprises, technology transfer and participation in the EU framework programmes. Furthermore, the Enterprise Europe Network helps entrepreneurs find foreign partners and organise their participation in fairs and economic missions.

PARP is also the operator of the project “Polish Silicon Bridge”, the objective of which is to support Polish firms from new-tech sectors in their expansion to the US market.

PARP regularly adjust its information and advisory offer to changing needs of entrepreneurs and emerging new communication channels. The Agency currently operates around a dozen specialist websites and social networking websites offering e-learning courses, e-books, transmissions from training meetings and conferences, information on possibility to apply for support, knowledge databases, publications and research results. Information and tools provided on all PARP websites which may be accessed via the main website of the Agency www.parp.gov.pl are used by almost a million Internet users a month.

The Agency is also involved in preparing the participation of Poland in World Expositions EXPO. After Saragossa (2008) and Shanghai (2010), PARP is the main operator of EXPO project in Milan (2015). The participation of Poland in World Exposition EXPO 2015 in Milan is an opportunity to establish contacts between Polish producers of high quality raw materials, food products, as well as technologies and machinery for agri-food sector, and foreign partners. Information for Polish companies interested in implementing the economic programme is available at: www.expo.gov.pl/promocja-gospodarcza

Everyone interested in obtaining information on support programmes offered by PARP for entrepreneurs and business environment institutions may use the helpline operated by the PARP Information Centre.

Polish Agency for Enterprise Development

ul. Pańska 81/83; 00-834 Warsaw

Phone: +48 22 432 80 80 Fax: +48 22 432 86 20

www.parp.gov.pl e-mail: biuro@parp.gov.pl

e-mail: info@parp.gov.pl

Helpline for entrepreneurs:

Phone: + 48 22 432 89 91

Phone: + 48 22 432 89 92

Phone: + 48 22 432 89 93